NAME				Eliot
DESCRIPTION 	'Eliot pour Windows'
EXETYPE 			WINDOWS
STUB 				'WINSTUB.EXE'
CODE 				PRELOAD MOVEABLE DISCARDABLE
DATA 				PRELOAD MOVEABLE MULTIPLE

; Note: The following are recommended settings for the default
; values when the application is compiled as a 16-bit target.
;
;HEAPSIZE    4096
;STACKSIZE   8192
